200 400 600 800 1000 40

60

80

100

120

140 light scalar Higgs mass

10

5 0.5

2

2a)

M = 400 GeV

200 400 600 800 1000

200

220

240

260

280

300 heavy scalar Higgs mass

0.5

2 5

10

2b)

M = 400 GeV

-200 -100 0 100 200 90

95

100

105

110

115

120

A = 300 GeV

200 GeV 100 GeV 0

2c)

M = 400 GeV

-200 -100 0 100 200 60

70

80

90

100

110

A = 300 GeV

200 GeV

100 GeV 0

2d)

M = 400 GeV